22.19 22.2 22.21 22.22 22.23 22.24 22.25 22.26

-0.2

0

0.2

0.4

0.6

Tb [K]

22.19 22.2 22.21 22.22 22.23 22.24 22.25 22.26 0.2 0.3 0.4 0.5 0.6 0.7 0.8

22.19 22.2 22.21 22.22 22.23 22.24 22.25 22.26

-0.04

-0.02

0

0.02

0.04

Frequency [GHz]